0 1 2 3 4 5 6 7 8 9 10 11 12 0

10

20

30

Photo

Plasma Pair

Log T (K) = 9.0 (n=2)

Fig.3

Log (�/�_e) [g cm^{–3}]

Log Q [ergs cm–3 s–1 ]