\documentstyle[11pt]{article}
\textwidth11in
\oddsidemargin0in
\evensidemargin0in
\topmargin0in
\headsep0in
\textheight8.5in
\footheight0in
\footskip0in
\special{landscape()}
\pagestyle{empty}
\begin{document}
%\small

Table 3. Basic Properties of Atlas Stars
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No.  & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

1   &  93250  & O3 V((f))    &  7.38 &  0.15 & 0.48 & -6.1 & 12.1  & 48500 & 
4.36 & -10.5 & 82.0 &  15.6 & 0.38 & 1112 & --0.5 & 70 \\
2   & 303308  & O3 V((f))    &  8.17 &  0.13 & 0.46 & -5.3 & 12.1  & 48500 & 
4.36 &  -9.7 & 60.0 &  10.8 & 0.25 & 1261 &  &  \\
3   &  66811  & O4 I(n)f     &  2.25 & -0.28 & 0.03 & -6.1 &  8.0  & 42400 & 
3.93 & -10.0 & 59.0 &  16.7 & 0.34 &  945 & --24.1   & 208 \\
4   &  46223  & O4 V((f))    &  7.25 &  0.22 & 0.55 & -5.3 & 10.9  & 46400 & 
4.21 &  -9.5 & 52.0 &  11.0 & 0.25 & 1161 & +41.1 & 95 \\
5   &  96715  & O4 V((f))    &  8.26 &  0.07 & 0.40 & -6.3 & 13.4  & 46400 & 
4.21 & -10.5 & 81.0 &  17.4 & 0.41 & 1025 &  &  \\
6   &  14947  & O5 If+       &  8.00 &  0.45 & 0.76 & -6.1 & 11.8  & 40300 & 
3.78 &  -9.9 & 52.0 &  17.3 & 0.33 &  875 & --56.2 & 130 \\
7   &  15558  & O5 III(f)    &  7.81 &  0.52 & 0.84 & -6.4 & 11.7  & 42300 & 
3.92 & -10.3 & 68.0 &  19.2 & 0.38 &  914 & --41.9 SB1O & 145 \\
8   &  15629  & O5 V((f))    &  8.43 &  0.42 & 0.75 & -5.5 & 11.7  & 44300 & 
4.06 &  -9.6 & 50.0 &  12.3 & 0.28 & 1058 &  &  \\
9   &  46150  & O5 V((f))    &  6.72 &  0.13 & 0.46 & -5.5 & 10.9  & 44300 & 
4.06 &  -9.6 & 50.0 &  12.3 & 0.28 & 1058 & +38.8    & 118 \\
10  &  93204  & O5 V((f))    &  8.42 &  0.10 & 0.43 & -4.9 & 12.1  & 44300 & 
4.06 &  -9.0 & 42.0 &   9.4 & 0.19 & 1179 &  &  \\
11  & 210839  & O6 I(n)fp    &  5.05 &  0.25 & 0.56 & -6.3 &  9.5  & 38200 & 
3.62 &  -9.9 & 51.0 &  19.6 & 0.35 &  802 &  --70.7 & 214 \\
12  &    108  & O6: f?pe     &  7.40 &  0.18 & 0.49 & -6.1 & 12.0  & 38200 & 
3.62 &  -9.7 & 48.0 &  17.9 & 0.31 &  840 & --67.9 & 100 \\
13  &  93130  & O6 III(f)    &  8.06 &  0.22 & 0.54 & -5.6 & 12.0  & 40200 & 
3.78 &  -9.4 & 43.0 &  13.8 & 0.25 &  942 &  &  \\
14  &  39680  & O6 V:[n]pe   &  7.99 &  0.02 & 0.35 & -5.3 & 12.2  & 42200 & 
3.91 &  -9.2 & 42.0 &  11.6 & 0.24 & 1028 & +53.4 & 122 \\
15  &  91572  & O6 V((f))    &  8.20 &  0.05 & 0.38 & -4.9 & 12.0  & 42200 & 
3.91 &  -8.8 & 38.0 &   9.6 & 0.18 & 1110 &  &  \\
16  &  93146  & O6 V((f))    &  8.80 &  0.00 & 0.33 & -4.2 & 12.0  & 42200 & 
3.91 &  -8.1 & 31.0 &   7.0 & 0.12 & 1224 &  &  \\
17  & 101190  & O6 V((f))    &  7.32 &  0.06 & 0.39 & -5.7 & 11.9  & 42200 & 
3.91 &  -9.6 & 48.0 &  13.9 & 0.30 &  960 & +0.7 & 190 \\
18  & 163758  & O6.5 Iaf     &  7.31 &  0.03 & 0.34 & -6.3 & 12.5  & 37200 & 
3.56 &  -9.9 & 50.0 &  20.1 & 0.34 &  792 & --47.7 & 95 \\
19  & 148937  & O6.5 f?p     &  6.71 &  0.34 & 0.65 & -6.0 & 10.7  & 37200 & 
3.56 &  -9.6 & 44.0 &  17.5 & 0.29 &  823 & --43.5  & 200 \\
20  &  69464  & O6.5 Ib(f)   &  8.84 &  0.31 & 0.62 & -6.3 & 13.2  & 37200 & 
3.56 &  -9.9 & 49.0 &  20.1 & 0.35 &  779 &  &  \\
21  & 190864  & O6.5 III(f)  &  7.76 &  0.20 & 0.52 & -5.6 & 11.8  & 39200 & 
3.70 &  -9.3 & 42.0 &  14.0 & 0.24 &  932 & --1.1 SB1? & 69 \\
22  &   5005A & O6.5 V((f))  &  7.76 &  0.09 & 0.41 & -6.4 & 12.9  & 41200 & 
3.85 & -10.3 & 64.0 &  19.6 & 0.41 &  860 & --24.8 & 95 \\
23  &  12993  & O6.5 V       &  8.95 &  0.20 & 0.52 & -4.4 & 11.8  & 41200 & 
3.85 &  -8.3 & 31.0 &   7.8 & 0.13 & 1146 &  &  \\
24  &  42088  & O6.5 V       &  7.55 &  0.07 & 0.39 & -4.5 & 10.9  & 41200 & 
3.85 &  -8.4 & 32.0 &   8.2 & 0.14 & 1133 & +23.1 & 136 \\
25  &  54662  & O6.5 V       &  6.21 &  0.03 & 0.35 & -5.4 & 10.6  & 41200 & 
3.85 &  -9.3 & 42.0 &  12.4 & 0.25 &  988 & +58.5     &  70 \\
26  & 101436  & O6.5 V       &  7.67 &  0.07 & 0.39 & -5.4 & 11.9  & 41200 & 
3.85 &  -9.3 & 42.0 &  12.4 & 0.25 &  988 & --3.7 SB1? & 270 \\
27  & 192639  & O7 Ib(f)     &  7.11 &  0.35 & 0.66 & -6.2 & 11.3  & 36100 & 
3.48 &  -9.7 & 43.0 &  19.6 & 0.34 &  745 & --5.3 & 103 \\
28  &  34656  & O7 II(f)     &  6.79 &  0.02 & 0.34 & -4.8 & 10.6  & 38100 & 
3.62 &  -8.4 & 30.0 &   9.9 & 0.15 &  993 &  --9.2    &  106 \\
29  & 151515  & O7 II(f)     &  7.16 &  0.18 & 0.50 & -5.7 & 11.4  & 38100 & 
3.62 &  -9.3 & 41.0 &  14.9 & 0.25 &  885 & --8.6 SB1? & 115 \\
30  &  36879  & O7 V(n)      &  7.56 &  0.22 & 0.54 & -5.5 & 11.4  & 40100 & 
3.77 &  -9.3 & 41.0 &  13.2 & 0.26 &  939 & +25.1 & 200 \\
\hline

\end{tabular}
\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

31  &  91824  & O7 V((f))    &  8.16 & -0.06 & 0.26 & -4.8 & 12.2  & 40100 & 
3.77 &  -8.6 & 33.0 &   9.5 & 0.17 & 1048 &  &  \\
32  & 162978  & O7.5 II((f)) &  6.18 &  0.05 & 0.36 & -5.8 & 10.9  & 37100 & 
3.55 &  -9.4 & 40.0 &  16.0 & 0.27 &  838 & --6.9     &  50 \\
33  & 186980  & O7.5 III((f) &  7.45 &  0.08 & 0.39 & -5.5 & 11.7  & 37100 & 
3.55 &  -9.1 & 35.0 &  13.9 & 0.23 &  860 & +3.3 & 70 \\
34  &  53975  & O7.5 V       &  6.47 & -0.10 & 0.22 & -4.8 & 10.6  & 39100 & 
3.70 &  -8.5 & 31.0 &   9.7 & 0.17 & 1007 & +39.7 SB1?   & 147 \\
35  & 152590  & O7.5 V       &  8.42 &  0.14 & 0.46 & -4.4 & 11.4  & 39100 & 
3.70 &  -8.1 & 28.0 &   8.1 & 0.13 & 1073 &  &  \\
36  & 152408  & O8: Iafpe    &  5.77 &  0.16 & 0.45 & -7.0 & 11.4  & 34000 & 
3.31 & -10.3 & 60.0 &  29.6 & 0.42 &  673 & --71.6    & 130: \\
37  & 151804  & O8 Iaf       &  5.22 &  0.07 & 0.36 & -7.3 & 11.4  & 34000 & 
3.31 & -10.6 & 70.0 &  34.0 & 0.47 &  646 & --46.7    & 50 \\
38  & 175754  & O8 II((f))   &  7.04 & -0.07 & 0.24 & -5.5 & 11.8  & 36000 & 
3.46 &  -9.0 & 34.0 &  14.2 & 0.22 &  846 & +0.5 & 161 \\
39  &  36861  & O8 III((f))  &  3.66 & -0.19 & 0.12 & -5.2 &  8.5  & 36000 & 
3.46 &  -8.7 & 30.0 &  12.3 & 0.19 &  868 & +32.8   &  53 \\
40  &  46966  & O8 V         &  6.88 & -0.04 & 0.28 & -4.8 & 10.9  & 38000 & 
3.62 &  -8.4 & 29.0 &   9.9 & 0.17 &  964 & +35.6  &  60 \\
41  &  48279  & O8 V         &  7.97 &  0.11 & 0.43 & -4.5 & 11.2  & 38000 & 
3.62 &  -8.1 & 28.0 &   8.6 & 0.13 & 1037 & +32.2 SB1? & 123 \\
42  & 101413  & O8 V         &  8.36 &  0.08 & 0.40 & -4.7 & 11.9  & 38000 & 
3.62 &  -8.3 & 29.0 &   9.5 & 0.15 &  995 &  &  \\
43  &  14633  & ON8 V        &  7.47 & -0.21 & 0.11 & -4.4 & 11.6  & 38000 & 
3.62 &  -8.0 & 27.0 &   8.3 & 0.12 & 1046 & --37.8 SB1? & 111 \\
44  & 112244  & O8.5 Iab(f)  &  5.33 &  0.01 & 0.29 & -6.6 & 11.0  & 33000 & 
3.23 &  -9.8 & 46.0 &  25.2 & 0.35 &  674 & +18.8 SB1? & 70 \\
45  &  74194  & O8.5 Ib(f)   &  7.54 &  0.23 & 0.51 & -5.4 & 11.3  & 33000 & 
3.23 &  -8.6 & 28.0 &  14.5 & 0.19 &  773 & --0.2 SB1? & 170 \\
46  &  96917  & O8.5 Ib(f)   &  7.09 &  0.09 & 0.37 & -6.6 & 12.5  & 33000 & 
3.23 &  -9.8 & 46.0 &  25.2 & 0.35 &  674 &  +1.9 SB1? & 130 \\
47  &  46149  & O8.5 V       &  7.61 &  0.19 & 0.50 & -4.8 & 10.9  & 37000 & 
3.54 &  -8.3 & 28.0 &  10.1 & 0.16 &  943 & +41.1 & 51 \\
48  & 149404  & O9 Ia        &  5.50 &  0.40 & 0.67 & -7.2 & 10.7  & 32000 & 
3.14 & -10.3 & 60.0 &  33.9 & 0.43 &  622 & --28.0 SB2O   & 45 \\
49  & 210809  & O9 Iab       &  7.55 &  0.05 & 0.32 & -6.2 & 12.7  & 32000 & 
3.14 &  -9.3 & 38.0 &  21.4 & 0.27 &  705 & --81.5 & 101 \\
50  &  37043  & O9 III       &  2.77 & -0.24 & 0.07 & -5.9 &  8.5  & 34000 & 
3.31 &  -9.2 & 36.0 &  17.7 & 0.25 &  763 & +26.6 SB2O  & 71 \\ 
51  &  46202  & O9 V         &  8.17 &  0.17 & 0.48 & -4.2 & 10.9  & 35900 & 
3.46 &  -7.7 & 23.0 &   7.8 & 0.10 & 1002 &  &  \\
52  &  93028  & O9 V         &  8.36 & -0.06 & 0.25 & -4.4 & 12.0  & 35900 & 
3.46 &  -7.9 & 24.0 &   8.6 & 0.12 &  969 &  &  \\
53  & 214680  & O9 V         &  4.87 & -0.20 & 0.11 & -4.4 &  8.9  & 35900 & 
3.46 &  -7.9 & 24.0 &   8.6 & 0.12 &  969 & --9.3   &  32 \\
54  &  12323  & ON9 V        &  8.90 & -0.12 & 0.19 & -3.5 & 11.8  & 35900 & 
3.46 &  -7.0 & 21.0 &   5.7 & 0.06 & 1152 &  &  \\
55  & 201345  & ON9 V        &  7.66 & -0.13 & 0.18 & -4.2 & 11.3  & 35900 & 
3.46 &  -7.7 & 23.0 &   7.8 & 0.10 & 1002 & +21.6 & 54 \\
56  &  30614  & O9.5 Ia      &  4.29 &  0.03 & 0.28 & -6.7 & 10.2  & 30900 & 
3.04 &  -9.7 & 43.0 &  27.6 & 0.34 &  626 &  +10.7    &   85 \\
57  & 188209  & O9.5 Iab     &  5.64 & -0.08 & 0.17 & -6.7 & 11.8  & 30900 & 
3.04 &  -9.7 & 43.0 &  27.6 & 0.34 &  626 &  --5.1   &  70 \\
58  & 218915  & O9.5 Iab     &  7.18 &  0.02 & 0.27 & -6.7 & 13.1  & 30900 & 
3.04 &  -9.7 & 43.0 &  27.6 & 0.34 &  626 & --66.9 & 110 \\
59  & 209975  & O9.5 Ib      &  5.11 &  0.09 & 0.35 & -5.7 &  9.5  & 30900 & 
3.04 &  -8.7 & 29.0 &  17.4 & 0.20 &  713 & --15.2  & 75 \\
60  & 189957  & O9.5 III     &  7.22 & -0.06 & 0.24 & -5.5 & 12.0  & 32900 & 
3.22 &  -8.7 & 29.0 &  15.2 & 0.20 &  764 & +39.1 &  \\
\hline

\end{tabular}

\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

61  &  34078  & O9.5 V       &  5.81 &  0.46 & 0.76 & -5.0 &  8.5  & 34900 & 
3.39 &  -8.4 & 27.0 &  11.6 & 0.17 &  859 & +54.4   &  27 \\
62  &  38666  & O9.5 V       &  5.16 & -0.29 & 0.01 & -3.4 &  8.5  & 34900 & 
3.39 &  -6.8 & 19.0 &   5.6 & 0.06 & 1111 & +109.8   & 97 \\
63  & 149038  & O9.7 Iab     &  4.89 &  0.09 & 0.33 & -6.7 & 10.6  & 30500 & 
3.00 &  -9.7 & 43.0 &  27.8 & 0.33 &  629 &  +6.5   & 85 \\
64  & 152405  & O9.7 Ib-II   &  7.20 &  0.11 & 0.38 & -5.4 & 11.4  & 30500 & 
3.00 &  -8.4 & 25.0 &  15.3 & 0.17 &  720 & --7.2 SB2? &  \\
65  & 152424  & OC9.7 Ia     &  6.35 &  0.37 & 0.61 & -7.1 & 11.4  & 30500 & 
3.00 & -10.1 & 52.0 &  33.4 & 0.39 &  600 & --42.3 SB1?  &  85 \\
66  & 105056  & ON9.7 Iae    &  7.55 &  0.06 & 0.30 & -6.7 & 13.3  & 30500 & 
3.00 &  -9.7 & 43.0 &  27.8 & 0.33 &  629 & --3.4 & 40 \\
67  & 123008  & ON9.7 Iab    &  8.83 &  0.39 & 0.63 & -6.7 & 13.5  & 30500 & 
3.00 &  -9.7 & 43.0 &  27.8 & 0.33 &  629 &      &  \\
68  &  37128  & B0 Iae       &  1.70 & -0.19 & 0.04 & -6.9 &  8.5c & 26000 & 
2.49 &  -9.4 & 34.0 &  33.1 & 0.30 &  522 & +26 SB  &  87   \\
69  &  91969  & B0 Ia        &  6.51 &  0.01 & 0.24 & -6.1 & 11.9c & 26000 & 
2.49 &  -8.6 & 25.0 &  22.9 & 0.20 &  578 &  --2     &  96 \\
70  & 164402  & B0 Ib        &  5.77 &  0.00 & 0.24 & -6.3 & 11.3c & 26000 & 
2.49 &  -8.8 & 27.0 &  25.1 & 0.22 &  566 & --13     & 100   \\
71  & 204172  & B0 Ib        &  5.94 & -0.08 & 0.16 & -5.8 & 11.2  & 26000 & 
2.49 &  -8.3 & 23.0 &  20.0 & 0.16 &  607 &  +3     &  80   \\
72  &  43818  & B0 II        &  6.92 &  0.29 & 0.58 & -5.4 & 10.5  & 27500 & 
2.69 &  -8.1 & 22.0 &  16.3 & 0.15 &  661 & +18     &  99 \\
73  &  48434  & B0 III       &  5.90 & -0.02 & 0.27 & -4.4 &  9.5  & 29000 & 
2.88 &  -7.3 & 17.0 &  10.1 & 0.09 &  763 & +35     &  70 \\
74  &  74753  & B0 IIIn      &  5.16 & -0.20 & 0.09 & -4.4 &  9.3  & 29000 & 
2.88 &  -7.3 & 17.0 &  10.1 & 0.09 &  763 & +28     & 288 \\
75  &  36512  & B0 V         &  4.62 & -0.26 & 0.04 & -4.0 &  8.5c & 30000 & 
3.16 &  -7.2 & 17.0 &   8.9 & 0.09 &  815 & +17V    &  20 \\
76  & 149438  & B0 V         &  2.82 & -0.25 & 0.05 & -3.3 &  6.0c & 30000 & 
3.16 &  -6.5 & 15.0 &   6.5 & 0.05 &  917 &  +2V    &  24 \\
77  &  38771  & B0.5 Ia      &  2.06 & -0.17 & 0.04 & -6.6 &  8.5c & 23400 & 
2.18 &  -8.8 & 26.0 &  30.9 & 0.23 &  496 & +21V?   &  82 \\
78  & 150898  & B0.5 Ia      &  5.58 & -0.08 & 0.13 & -6.9 & 12.1  & 23400 & 
2.18 &  -9.1 & 28.0 &  35.5 & 0.29 &  464 & --53V    & 128 \\
79  & 167756  & B0.5 Ia      &  6.30 & -0.11 & 0.10 & -6.9 & 12.9  & 23400 & 
2.18 &  -9.1 & 28.0 &  35.5 & 0.29 &  464 & --25 &  \\
80  &  64760  & B0.5 Ib      &  4.24 & -0.14 & 0.08 & -6.0 & 10.0  & 23400 & 
2.18 &  -8.2 & 21.0 &  23.4 & 0.17 &  534 & +41     & 238 \\
81  &  91943  & B0.5 Ib      &  6.71 &  0.07 & 0.29 & -6.1 & 11.9c & 23400 & 
2.18 &  -8.3 & 21.0 &  24.5 & 0.18 &  517 &  --7     &  69 \\
82  & 213087  & B0.5 Ibe     &  5.46 &  0.37 & 0.59 & -6.0 &  9.6  & 23400 & 
2.18 &  -8.2 & 21.0 &  23.4 & 0.17 &  534 & --15V &  \\
83  & 184915  & B0.5 III     &  4.36 &  0.00 & 0.28 & -4.8 &  8.3  & 26500 & 
2.43 &  -7.2 & 17.0 &  11.8 & 0.09 &  707 & --19V    & 259 \\
84  & 219188  & B0.5 III     &  7.09 &  0.06 & 0.34 & -4.8 & 10.8  & 26500 & 
2.43 &  -7.2 & 17.0 &  11.8 & 0.09 &  707 & +62V    & 265 \\
85  &  34816  & B0.5 IV      &  4.29 & -0.26 & 0.02 & -4.3 &  8.5c & 27700 & 
2.93 &  -7.2 & 17.0 &  10.8 & 0.09 &  739 & +20     &  67 \\
86  &  37061  & B0/1 V       &  6.83 &  0.26 & 0.54 & -3.6 &  8.8  & 27700 & 
2.93 &  -6.5 & 15.0 &   7.8 & 0.05 &  832 & +40     & 160 \\
87  &  96248  & B1 Iabe      &  6.56 &  0.19 & 0.38 & -6.9 & 12.3  & 20800 & 
1.87 &  -8.8 & 25.0 &  38.9 & 0.23 &  434 & --25     &  93 \\
88  & 152236  & B1 Iape      &  4.73 &  0.49 & 0.68 & -7.8 & 10.4c & 20800 & 
1.87 &  -9.7 & 34.0 &  58.9 & 0.39 &  366 & --26V    &  57 \\
89  & 152235  & B1 Iae       &  6.32 &  0.50 & 0.69 & -6.9 & 11.1  & 20800 & 
1.87 &  -8.8 & 26.0 &  38.9 & 0.22 &  445 & --36 &  \\
90  & 154090  & B1 Iae       &  4.87 &  0.26 & 0.45 & -6.9 & 10.4  & 20800 & 
1.87 &  -8.8 & 26.0 &  38.9 & 0.22 &  445 &  +4V?   &  91   \\
\hline

\end{tabular}

\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

91  & 109867  & B1 Ia        &  6.25 &  0.06 & 0.25 & -6.9 & 12.4  & 20800 & 
1.87 &  -8.8 & 26.0 &  38.9 & 0.22 &  445 & --16     &  88   \\
92  &  47240  & B1 Ib        &  6.15 &  0.14 & 0.34 & -5.8 & 10.9c & 20800 & 
1.87 &  -7.7 & 17.0 &  23.4 & 0.12 &  492 & +33V    & 126 \\
93  &  52382  & B1 Ib        &  6.49 &  0.21 & 0.41 & -5.5 & 10.7c & 20800 & 
1.87 &  -7.4 & 17.0 &  20.4 & 0.09 &  536 & +51     &  87 \\
94  &  73658  & B1 Ibe       &  6.88 &  0.05 & 0.25 & -5.8 & 11.9  & 20800 & 
1.87 &  -7.7 & 17.0 &  23.4 & 0.12 &  492 &  &  \\
95  & 157246  & B1 Ib        &  3.34 & -0.13 & 0.07 & -5.8 &  8.9  & 20800 & 
1.87 &  -7.7 & 17.0 &  23.4 & 0.12 &  492 &  --3V    & 281   \\
96  & 214080  & B1 Ib        &  6.83 & -0.13 & 0.07 & -5.8 & 12.4  & 20800 & 
1.87 &  -7.7 & 17.0 &  23.4 & 0.12 &  492 & +12V    & 100 \\
97  & 165793  & B1 II        &  6.58 & -0.03 & 0.23 & -5.4 & 11.3  & 20800 & 
1.87 &  -7.3 & 17.0 &  19.5 & 0.09 &  549 & +39V? &  \\
98  &  36591  & B1 IV        &  5.35 & -0.19 & 0.07 & -3.8 &  8.9  & 25400 & 
2.70 &  -6.5 & 14.0 &   9.2 & 0.06 &  741 & +34     &  29 \\
99  &  50707  & B1 IV        &  4.83 & -0.21 & 0.05 & -3.8 &  8.5  & 25400 & 
2.70 &  -6.5 & 14.0 &   9.2 & 0.06 &  741 & +28V    &  49 \\
100 &  52918  & B1 IV        &  4.99 & -0.20 & 0.06 & -3.8 &  8.6  & 25400 & 
2.70 &  -6.5 & 14.0 &   9.2 & 0.06 &  741 & +25V?   & 336   \\
101 &  37303  & B1 Vv        &  6.05 & -0.22 & 0.04 & -3.2 &  9.1  & 25400 & 
2.70 &  -5.9 & 12.0 &   7.0 & 0.04 &  796 & +29     & 260 \\
102 & 144470  & B1 V         &  3.96 & -0.04 & 0.22 & -3.2 &  6.5  & 25400 & 
2.70 &  -5.9 & 12.0 &   7.0 & 0.04 &  796 &  --3V    & 142 \\
103 & 106343  & B1.5 Ia      &  6.22 &  0.12 & 0.30 & -6.9 & 12.2  & 19700 & 
1.73 &  -8.6 & 24.0 &  40.7 & 0.23 &  416 &  --7     & 100  \\
104 & 148379  & B1.5 Iape    &  5.35 &  0.56 & 0.74 & -6.9 & 10.0  & 19700 & 
1.73 &  -8.6 & 24.0 &  40.7 & 0.23 &  416 & --12V    &  66 \\
105 & 190603  & B1.5 Iae     &  5.64 &  0.54 & 0.72 & -6.9 & 10.3  & 19700 & 
1.73 &  -8.6 & 24.0 &  40.7 & 0.23 &  416 & +21V    &  29   \\
106 &  74575  & B1.5 III     &  3.68 & -0.18 & 0.07 & -4.2 &  7.7  & 22100 & 
2.20 &  -6.4 & 13.0 &  11.6 & 0.06 &  637 & +15V?   &  19 \\
107 &  37481  & B1.5 IV      &  5.96 & -0.23 & 0.02 & -3.5 &  9.4  & 23700 & 
2.52 &  -6.0 & 12.0 &   8.4 & 0.04 &  721 & +15V    & 105 \\
108 & 136298  & B1.5 IV      &  3.22 & -0.22 & 0.03 & -3.5 &  6.6  & 23700 & 
2.52 &  -6.0 & 12.0 &   8.4 & 0.04 &  721 &  +0V?   & 221 \\
109 &  35299  & B1.5 V       &  5.70 & -0.21 & 0.04 & -2.8 &  8.4  & 23700 & 
2.52 &  -5.3 & 10.0 &   6.1 & 0.03 &  779 & +22V    &  36 \\
110 &  37744  & B1.5 V       &  6.22 & -0.20 & 0.05 & -2.8 &  8.9  & 23700 & 
2.52 &  -5.3 & 10.0 &   6.1 & 0.03 &  779 & +29     &  35 \\
111 &  39777  & B1.5 V       &  6.57 & -0.18 & 0.07 & -2.8 &  9.2  & 23700 & 
2.52 &  -5.3 & 10.0 &   6.1 & 0.03 &  779 & +25     &  20 \\
112 &  74273  & B1.5 V       &  5.90 & -0.21 & 0.04 & -2.8 &  8.6  & 23700 & 
2.52 &  -5.3 & 10.0 &   6.1 & 0.03 &  779 & +18     & 181 \\
113 &  41117  & B2 Iave      &  4.63 &  0.28 & 0.44 & -6.9 & 10.2  & 18500 & 
1.58 &  -8.5 & 25.0 &  43.4 & 0.19 &  422 & +17V    &  36 \\
114 & 165024  & B2 Ib        &  3.66 & -0.08 & 0.10 & -5.7 &  9.1  & 18500 & 
1.58 &  -7.3 & 16.0 &  24.8 & 0.10 &  471 &  +3     & 117 \\
115 & 206165  & B2 Ib        &  4.73 &  0.30 & 0.48 & -6.5 &  9.7c & 18500 & 
1.58 &  -8.1 & 19.0 &  35.8 & 0.18 &  408 & --13V?   &  36 \\
116 &  52089  & B2 II        &  1.50 & -0.21 & 0.02 & -4.8 &  6.2  & 18500 & 
1.58 &  -6.4 & 12.0 &  16.4 & 0.06 &  513 & +27     &  44   \\
117 &  92936  & B2 III       &  7.05 & -0.04 & 0.20 & -3.9 & 10.3  & 20300 & 
2.02 &  -5.9 & 11.0 &  11.0 & 0.04 &  605 & --16 &  \\
118 & 106490  & B2 IV        &  2.80 & -0.23 & 0.01 & -3.1 &  5.9  & 22000 & 
2.35 &  -5.4 & 10.0 &   7.5 & 0.03 &  701 & +22V?   & 194 \\
119 &  37356  & B2 IV-V      &  6.19 & -0.04 & 0.20 & -2.8 &  8.4  & 22000 & 
2.35 &  -5.2 & 10.0 &   6.6 & 0.02 &  754 & +29     &  10 \\
120 &  37776  & B2 IV-V      &  6.96 & -0.14 & 0.10 & -2.8 &  9.5  & 22000 & 
2.35 &  -5.2 & 10.0 &   6.6 & 0.02 &  754 & +28     & 157 \\
\hline

\end{tabular}

\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

121 &  39291  & B2 IV-V      &  5.35 & -0.20 & 0.04 & -2.8 &  8.0  & 22000 & 
2.35 &  -5.2 & 10.0 &   6.6 & 0.02 &  754 & +20V    & 164 \\
122 & 142669  & B2 IV-V      &  3.88 & -0.20 & 0.04 & -2.8 &  6.6  & 22000 & 
2.35 &  -5.2 & 10.0 &   6.6 & 0.02 &  754 &  --0V?   & 156 \\
123 &  36166  & B2 V         &  5.78 & -0.20 & 0.04 & -2.5 &  8.2  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 & +12V    & 175 \\
124 &  36430  & B2 V         &  6.22 & -0.17 & 0.07 & -2.5 &  8.5  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 & +23     &  25 \\
125 &  74234  & B2 V         &  6.95 & -0.16 & 0.08 & -2.5 &  9.2  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 &  +8     & 233 \\
126 & 108483  & B2 V         &  3.91 & -0.19 & 0.05 & -2.5 &  6.3  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 &  +8V    & 245 \\
127 & 145482  & B2 V         &  4.59 & -0.16 & 0.08 & -2.5 &  6.8  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 & +10V    & 225 \\
128 & 148605  & B2 V         &  4.79 & -0.11 & 0.13 & -2.5 &  6.9  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 &  +4V    & 232 \\
129 & 212978  & B2 V         &  6.14 & -0.14 & 0.10 & -2.5 &  8.3  & 22000 & 
2.35 &  -4.8 &  9.0 &   5.7 & 0.02 &  768 & --17     & 115 \\
130 &  92964  & B2.5 Iae     &  5.38 &  0.26 & 0.40 & -7.8 & 11.9c & 17400 & 
1.42 &  -9.2 & 29.0 &  68.4 & 0.33 &  329 &  --2     &  68 \\
131 &  42087  & B2.5 Ibe     &  5.75 &  0.21 & 0.36 & -6.2 & 10.9c & 17400 & 
1.42 &  -7.6 & 17.0 &  32.7 & 0.13 &  415 & +16V    &  37   \\
132 & 116084  & B2.5 Ib      &  5.83 &  0.12 & 0.27 & -5.6 & 10.6  & 17400 & 
1.42 &  -7.0 & 15.0 &  24.8 & 0.08 &  459 & --15 &  \\
133 & 166596  & B2.5 III     &  5.47 & -0.17 & 0.05 & -3.5 &  8.8  & 18700 & 
1.81 &  -5.3 &  9.7 &   9.8 & 0.03 &  607 & --15V?   & 197 \\
134 & 125238  & B2.5 IV      &  3.55 & -0.18 & 0.04 & -2.7 &  6.1  & 20400 & 
2.15 &  -4.9 & 10.0 &   6.8 & 0.17 &  671 & +22     & 370 \\
135 &  36779  & B2.5 V       &  6.22 & -0.17 & 0.05 & -2.0 &  8.1  & 20400 & 
2.15 &  -4.2 &  8.3 &   4.9 & 0.01 &  799 &  +4     & 227 \\
136 & 175191  & B2.5 V       &  2.02 & -0.22 & 0.00 & -2.0 &  4.0  & 20400 & 
2.15 &  -4.2 &  8.3 &   4.9 & 0.01 &  799 & --11V    & 201 \\
137 & 144294  & B2.5 Vn      &  4.23 & -0.17 & 0.05 & -2.0 &  6.1  & 20400 & 
2.15 &  -4.2 &  8.3 &   4.9 & 0.01 &  799 & +15     & 309 \\
138 & 168905  & B2.5 Vn      &  5.25 & -0.19 & 0.03 & -2.0 &  7.2  & 20400 & 
2.15 &  -4.2 &  8.3 &   4.9 & 0.01 &  799 &  +0     & 297 \\
139 & 225094  & B3 Iae       &  6.24 &  0.33 & 0.45 & -7.2 & 12.0c & 16300 & 
1.26 &  -8.5 & 23.0 &  54.9 & 0.21 &  356 & --43V? &  \\
140 & 198478  & B3 Iae       &  4.84 &  0.41 & 0.53 & -6.3 &  9.5c & 16300 & 
1.26 &  -7.6 & 17.0 &  36.3 & 0.12 &  396 &  --7V    &  35   \\
141 &  75149  & B3 Ia        &  5.46 &  0.27 & 0.39 & -7.1 & 11.4c & 16300 & 
1.26 &  -8.4 & 23.0 &  52.4 & 0.19 &  368 & +26     &  73 \\
142 &  53138  & B3 Iab       &  3.02 & -0.08 & 0.05 & -6.5 &  9.4c & 16300 & 
1.26 &  -7.8 & 19.0 &  39.8 & 0.13 &  398 & +48 SB  &  44 \\
143 &  43384  & B3 Ib        &  6.25 &  0.45 & 0.59 & -6.5 & 10.9c & 16300 & 
1.26 &  -7.8 & 19.0 &  39.8 & 0.13 &  398 & +13V    &  51 \\
144 &  51309  & B3 II        &  4.37 & -0.07 & 0.13 & -4.5 &  8.5  & 16700 & 
1.43 &  -5.9 & 11.0 &  16.3 & 0.04 &  496 & +41     &  29 \\
145 &  21483  & B3 III       &  7.06 &  0.36 & 0.56 & -3.0 &  8.3  & 17100 & 
1.60 &  -4.6 &  8.4 &   8.4 & 0.02 &  611 &  --5 &  \\
146 & 198820  & B3 III       &  6.44 & -0.15 & 0.05 & -3.0 &  9.3  & 17100 & 
1.60 &  -4.6 &  8.4 &   8.4 & 0.02 &  611 & --18V? &  \\
147 & 209008  & B3 III       &  6.00 & -0.12 & 0.08 & -3.0 &  8.8  & 17100 & 
1.60 &  -4.6 &  8.4 &   8.4 & 0.02 &  611 &  --7V?   &  78 \\
148 & 157038  & B4 Ia        &  6.41 &  0.64 & 0.74 & -7.0 & 11.1  & 14900 & 
1.10 &  -8.1 & 20.0 &  55.7 & 0.17 &  337 & --14     &       \\
149 &  58350  & B5 Ia        &  2.45 & -0.08 & 0.00 & -7.0 &  9.4c & 13600 & 
0.95 &  -7.9 & 18.0 &  62.4 & 0.17 &  303 & +41V    &  45   \\
150 &  79186  & B5 Ia        &  5.00 &  0.23 & 0.31 & -7.0 & 11.0  & 13600 & 
0.95 &  -7.9 & 18.0 &  62.4 & 0.17 &  303 & +34V    &  61 \\
\hline

\end{tabular}

\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

151 &  36371  & B5 Iab       &  4.76 &  0.34 & 0.44 & -7.2 & 10.6c & 13600 & 
0.95 &  -8.1 & 19.0 &  68.4 & 0.19 &  293 &  --0 SB  &  41 \\
152 &  75129  & B5 Ib        &  6.87 &  0.26 & 0.36 & -5.4 & 11.2  & 13600 & 
0.95 &  -6.3 & 12.0 &  29.9 & 0.06 &  380 &  &  \\
153 &  86440  & B5 Ib        &  3.54 & -0.08 & 0.02 & -5.4 &  8.9  & 13600 & 
0.95 &  -6.3 & 12.0 &  29.9 & 0.06 &  380 & +14     &  45   \\
154 & 164353  & B5 Ib        &  3.97 &  0.02 & 0.12 & -5.4 &  9.0  & 13600 & 
0.95 &  -6.3 & 12.0 &  29.9 & 0.06 &  380 &  --4V    &  22   \\
155 &  83183  & B5 II        &  4.08 &  0.01 & 0.17 & -4.0 &  7.6  & 14300 & 
1.12 &  -5.1 &  9.2 &  15.3 & 0.02 &  473 & +22V    &   0 \\
156 & 175156  & B5 II        &  5.10 &  0.17 & 0.33 & -4.0 &  8.1  & 14300 & 
1.12 &  -5.1 &  9.2 &  15.3 & 0.02 &  473 &  --3V    &  19 \\
157 &  45057  & B5 III       &  6.86 & -0.14 & 0.03 & -2.2 &  9.0  & 15000 & 
1.30 &  -3.5 &  6.8 &   6.6 & 0.01 &  624 & +29     &  86 \\
158 &  72232  & B5 III       &  5.99 & -0.15 & 0.02 & -2.2 &  8.1  & 15000 & 
1.30 &  -3.5 &  6.8 &   6.6 & 0.01 &  624 & +12 &  \\
159 &  72798  & B5 III       &  6.45 & -0.14 & 0.03 & -2.2 &  8.6  & 15000 & 
1.30 &  -3.5 &  6.8 &   6.6 & 0.01 &  624 & +22V    &       \\
160 & 209419  & B5 III       &  5.78 & -0.11 & 0.06 & -2.2 &  7.8  & 15300 & 
1.30 &  -3.5 &  6.8 &   6.3 & 0.01 &  637 & --22V? &  \\
161 &  74371  & B6 Iae       &  5.23 &  0.21 & 0.27 & -7.0 & 11.4  & 12600 & 
0.83 &  -7.8 & 17.0 &  68.8 & 0.16 &  282 & +24     &  53 \\
162 & 125288  & B6 Ib        &  4.33 &  0.12 & 0.20 & -5.3 &  9.0  & 12600 & 
0.83 &  -6.1 & 11.0 &  31.4 & 0.05 &  356 &  +4V    &  10 \\
163 & 155763  & B6 III       &  3.17 & -0.12 & 0.03 & -1.8 &  4.9  & 14100 & 
1.13 &  -2.9 &  5.9 &   5.7 & 0.00 &  624 & --17V    &  31 \\
164 &  91619  & B7 Iae       &  6.14 &  0.35 & 0.39 & -7.0 & 11.9c & 12200 & 
0.78 &  -7.8 & 18.0 &  71.7 & 0.14 &  287 &  +7     &  52 \\
165 &   1279  & B7 III       &  5.89 & -0.09 & 0.04 & -1.5 &  7.3  & 13200 & 
0.97 &  -2.5 &  5.4 &   5.3 & 0.00 &  622 &  --9V    &   0 \\
166 & 142514  & B7 III       &  5.75 & -0.06 & 0.07 & -1.5 &  7.0  & 13200 & 
0.97 &  -2.5 &  5.4 &   5.3 & 0.00 &  622 &   0     &       \\
167 & 210424  & B7 III       &  5.46 & -0.12 & 0.01 & -1.5 &  6.9  & 13200 & 
0.97 &  -2.5 &  5.4 &   5.3 & 0.00 &  622 &  +3V?   &  18 \\
168 &  34085  & B8 Iae       &  0.12 & -0.03 & 0.00 & -8.4 &  8.5c & 11200 & 
0.66 &  -9.1 & 26.0 & 153.3 & 0.32 &  210 & +21 SB  &  33   \\
169 & 166937  & B8 Iape      &  3.86 &  0.23 & 0.25 & -8.2 & 11.3c & 11200 & 
0.66 &  -8.9 & 25.0 & 139.8 & 0.28 &  222 &  --6 SB  & <54 \\
170 & 199478  & B8 Iae       &  5.67 &  0.47 & 0.49 & -7.1 & 11.3  & 11200 & 
0.66 &  -7.8 & 18.0 &  84.3 & 0.14 &  265 & --15V &  \\
171 &  12301  & B8 Ib        &  5.58 &  0.38 & 0.42 & -5.2 &  9.5  & 11200 & 
0.66 &  -5.9 & 11.0 &  35.1 & 0.04 &  339 & --20 &  \\
172 &  46769  & B8 Ib        &  5.80 &  0.00 & 0.04 & -5.2 & 10.9  & 11200 & 
0.66 &  -5.9 & 11.0 &  35.1 & 0.04 &  339 & +10 &  \\
173 & 208501  & B8 Ib        &  5.80 &  0.73 & 0.77 & -6.3 &  9.7c & 11200 & 
0.66 &  -7.0 & 12.0 &  58.3 & 0.10 &  266 & --15V    &  53 \\
174 &  53244  & B8 II        &  4.12 & -0.12 & 0.00 & -3.1 &  7.2  & 11800 & 
0.74 &  -3.8 &  7.3 &  12.5 & 0.01 &  470 & +32V    &  27 \\
175 &  47670  & B8 III       &  3.17 & -0.11 & 0.00 & -1.2 &  4.4  & 12400 & 
0.82 &  -2.0 &  4.8 &   4.9 & 0.00 &  611 & +28 SB  & 228 \\
176 & 202850  & B9 Iab       &  4.23 &  0.12 & 0.14 & -6.2 & 10.0  & 10300 & 
0.52 &  -6.7 & 11.0 &  61.7 & 0.09 &  249 &  --4 SB  &  28 \\
177 & 212593  & B9 Iab       &  4.57 &  0.09 & 0.11 & -6.2 & 10.4  & 10300 & 
0.52 &  -6.7 & 11.0 &  61.7 & 0.09 &  249 & --26     &  27 \\
178 &  46885  & B9 III       &  6.55 & -0.06 & 0.01 & -0.6 &  7.1  & 11000 & 
0.71 &  -1.3 &  4.1 &   4.5 & 0.00 &  590 & +13V    &  35 \\
179 & 100841  & B9 III       &  3.13 & -0.04 & 0.03 & -0.6 &  3.6  & 11000 & 
0.71 &  -1.3 &  4.1 &   4.5 & 0.00 &  590 &  --1V    &   0   \\
180 & 144206  & B9 III       &  4.76 & -0.11 & 0.00 & -0.6 &  5.4  & 11000 & 
0.71 &  -1.3 &  4.1 &   4.5 & 0.00 &  590 &  +3     &   6 \\
\hline

\end{tabular}

\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

181 & 176437  & B9 III       &  3.24 & -0.05 & 0.02 & -0.6 &  3.8  & 11000 & 
0.71 &  -1.3 &  4.1 &   4.5 & 0.00 &  590 & --21V    &  76   \\
182 & 192907  & B9 III       &  4.39 & -0.05 & 0.02 & -0.6 &  4.9  & 11000 & 
0.71 &  -1.3 &  4.1 &   4.5 & 0.00 &  590 & --23V    &  18   \\
183 & 198667  & B9 III       &  5.55 & -0.08 & 0.00 & -0.6 &  6.2  & 11000 & 
0.71 &  -1.3 &  4.1 &   4.5 & 0.00 &  590 &  --2V    &  50  \\
184 & 169022  & B9.5 III     &  1.85 & -0.03 & 0.02 & -0.3 &  2.1  & 10000 & 
0.46 &  -0.8 &  3.7 &   4.2 & 0.00 &  579 & --15     & 140  \\
185 &  21389  & A0 Iae       &  4.54 &  0.56 & 0.54 & -7.2 & 10.1c &  9730 & 
0.41 &  -7.6 & 14.0 & 104.2 & 0.08 &  217 &  --6 SB  &   6 \\
186 &  92207  & A0 Iae       &  5.45 &  0.50 & 0.48 & -7.9 & 11.9c &  9730 & 
0.41 &  -8.3 & 22.0 & 143.8 & 0.09 &  230 &  --9 SB  &  56 \\
187 & 223960  & A0 Iae       &  6.90 &  0.71 & 0.69 & -7.2 & 12.0c &  9730 & 
0.41 &  -7.6 & 14.0 & 104.2 & 0.08 &  217 & --48V &  \\
188 &  46300  & A0 Ib        &  4.50 &  0.00 & 0.01 & -4.8 &  9.3c &  9730 & 
0.41 &  -5.2 &  9.5 &  34.5 & 0.01 &  322 & +12     &  17 \\
189 &  87737  & A0 Ib        &  3.52 & -0.03 & 0.00 & -5.2 &  8.7  &  9730 & 
0.41 &  -5.6 & 10.0 &  41.5 & 0.02 &  301 &  +3V    &  20   \\
190 & 175687  & A0 II        &  5.08 &  0.13 & 0.16 & -3.0 &  7.6  &  9910 & 
0.42 &  -3.4 &  6.7 &  14.6 & 0.00 &  418 &  +2     &  14 \\
191 &  12953  & A1 Iae       &  5.79 &  0.61 & 0.59 & -7.8 & 11.8c &  9230 & 
0.32 &  -8.1 & 19.0 & 146.4 & 0.09 &  212 & --36V    &  18 \\
192 &  14433  & A1-3 Ia      &  6.39 &  0.58 & 0.55 & -7.1 & 11.8c &  9080 & 
0.28 &  -7.4 & 17.0 & 107.6 & 0.05 &  239 & --47V    & <45 \\
193 & 197345  & A2 Iae       &  1.25 &  0.09 & 0.06 & -8.4 &  9.5c &  9080 & 
0.28 &  -8.7 & 24.0 & 195.8 & 0.12 &  203 &  --5V    &  21   \\
194 &  14489  & A2 Ia        &  5.17 &  0.37 & 0.34 & -7.7 & 11.8c &  9080 & 
0.28 &  -8.0 & 20.0 & 141.9 & 0.08 &  223 & --15     &  25   \\
195 & 207260  & A2 Ia        &  4.29 &  0.52 & 0.49 & -6.9 &  9.7c &  9080 & 
0.28 &  -7.2 & 16.0 &  98.2 & 0.05 &  244 & --21V    &  33 \\
196 &  62623  & A2 Iabe      &  3.96 &  0.18 & 0.15 & -6.5 & 10.0  &  9080 & 
0.28 &  -6.8 & 15.0 &  81.6 & 0.03 &  260 & +25 SB  &  73 \\
197 & 182564  & A2 IIIs      &  4.59 &  0.02 & 0.00 &  0.3 &  4.3  &  9000 & 
0.20 &   0.1 &  3.0 &   3.5 & 0.00 &  572 & --29     &  27 \\
198 & 223385  & A3 Iae       &  5.43 &  0.67 & 0.62 & -8.5 & 12.0c &  8770 & 
0.21 &  -8.7 & 25.0 & 212.9 & 0.12 &  199 & --46 SB? &  50   \\
199 &  17378  & A5 Ia        &  6.25 &  0.89 & 0.80 & -8.0 & 11.8c &  8510 & 
0.13 &  -8.1 & 20.0 & 173.1 & 0.09 &  201 & --38V    &  37 \\
200 &  59612  & A5 Ib        &  4.85 &  0.23 & 0.14 & -5.1 &  9.5  &  8510 & 
0.13 &  -5.2 &  9.5 &  45.5 & 0.01 &  280 & +37     &  26   \\
201 &  34578  & A5 II        &  5.03 &  0.27 & 0.16 & -2.8 &  7.3  &  8300 & 
0.14 &  -2.9 &  5.9 &  16.7 & 0.00 &  367 &  --5     &  16 \\
202 &  74272  & A5 II        &  4.77 &  0.12 & 0.01 & -2.8 &  7.5  &  8300 & 
0.14 &  -2.9 &  5.9 &  16.7 & 0.00 &  367 & +17 SB  &   0 \\
203 & 147084  & A5 II        &  4.55 &  0.84 & 0.73 & -2.8 &  5.1  &  8300 & 
0.14 &  -2.9 &  5.9 &  16.7 & 0.00 &  367 &  --8     &   7 \\
204 &  97534  & A6 Iae       &  4.60 &  0.55 & 0.45 & -7.5 & 10.7  &  8330 & 
0.10 &  -7.6 & 17.0 & 141.5 & 0.06 &  207 &  --8     &  34   \\
205 &  73634  & A6 II        &  4.14 &  0.11 & 0.00 & -2.7 &  6.8  &  8100 & 
0.09 &  -2.8 &  5.7 &  16.3 & 0.00 &  364 & +19     &   0 \\
206 & 148743  & A7 Ib        &  6.50 &  0.37 & 0.24 & -5.1 & 10.9  &  8150 & 
0.06 &  -5.2 &  9.4 &  48.1 & 0.01 &  272 &  +2 SB? &  30 \\
207 &  80404  & A8 Ib        &  2.25 &  0.18 & 0.04 & -5.1 &  7.2  &  7950 & 
0.03 &  -5.1 &  9.4 &  49.8 & 0.01 &  267 & +13     &   0 \\
208 &  85123  & A8 Ib        &  2.96 &  0.27 & 0.13 & -5.1 &  7.7  &  7950 & 
0.03 &  -5.1 &  9.4 &  49.8 & 0.01 &  267 & +14     &   0   \\
209 & 196379  & A9 II        &  6.11 &  0.41 & 0.20 & -2.5 &  8.0  &  7560 & 
0.06 &  -2.6 &  5.4 &  16.9 & 0.00 &  349 & --13     &   3 \\
210 &   7927  & F0 Ia        &  4.98 &  0.68 & 0.51 & -8.0 & 11.4  &  7700 & 
0.01 &  -8.0 & 19.0 & 200.0 & 0.00 &  190 & --24 SB  &  27   \\
\hline

\end{tabular}

\newpage

Table3. (continued)
\medskip

\begin{tabular}{rrlrrrrrrrrrrrrrr} \hline \hline

No. & HD & Type & $V$ & $B-V$ & $E_{B-V}$ & $M_V$ & $m-M$ & $T_{eff}$ & $BC$ &
 $M_{bol}$ & $M_*$ & $R_*$ & ${\Gamma}_e$ & $V_{esc}$ & $V_{rad}$ & $Vsin$ $i$ \\
\hline

211 &  36673  & F0 Ib        &  2.58 &  0.21 & 0.02 & -5.1 &  7.6  &  7700 & 
0.01 &  -5.1 &  9.3 &  52.6 & 0.00 &  260 & +24     &  13   \\
212 &  45348  & F0 II        & -0.72 &  0.15 & 0.00 & -2.5 &  1.8  &  7420 & 
0.06 &  -2.6 &  5.5 &  17.5 & 0.00 &  346 & +21     &   0 \\
213 & 135153  & F1 II        &  4.91 &  0.37 & 0.10 & -2.4 &  7.0  &  7200 & 
0.06 &  -2.5 &  5.3 &  17.8 & 0.00 &  337 & --23     &    0 \\
214 & 159532  & F1 II        &  1.87 &  0.40 & 0.13 & -2.4 &  3.9  &  7200 & 
0.06 &  -2.5 &  5.3 &  17.8 & 0.00 &  337 &  +1     & 105 \\
215 & 182835  & F2 Ib        &  4.66 &  0.60 & 0.37 & -5.1 &  8.6  &  7350 & 
0.00 &  -5.1 &  9.2 &  57.5 & 0.00 &  247 &  --1     &  13   \\
216 &  90853  & F2 II        &  3.82 &  0.31 & 0.01 & -2.4 &  6.2  &  7110 & 
0.06 &  -2.5 &  5.3 &  18.2 & 0.00 &  333 &  +9     &  22 \\
217 & 164136  & F2 II        &  4.41 &  0.39 & 0.09 & -2.4 &  6.5  &  7100 & 
0.06 &  -2.5 &  5.3 &  18.3 & 0.00 &  333 & --22     &  28 \\
218 &  74180  & F3 Ia        &  3.84 &  0.71 & 0.46 & -9.0 & 11.4c &  7200 & 
0.00 &  -9.0 & 27.0 & 360.9 & 0.00 &  169 & +25V    &  38   \\
219 & 112374  & F3 Ia        &  6.62 &  0.68 & 0.43 & -8.0 & 13.3  &  7200 & 
0.00 &  -8.0 & 20.0 & 227.7 & 0.00 &  183 & --24 &  \\
220 & 161796  & F3 Ib        &  7.04 &  0.46 & 0.20 & -5.1 & 11.5  &  7200 & 
0.00 &  -5.1 &  9.3 &  59.9 & 0.00 &  243 & --53V &  \\
221 &  20902  & F5 Ib        &  1.79 &  0.48 & 0.15 & -5.1 &  6.4  &  6900 & 
0.03 &  -5.1 &  9.3 &  66.1 & 0.00 &  232 &  --2     &  18   \\
222 & 198726  & F5 Ib        &  5.77 &  0.72 & 0.39 & -5.1 &  9.7  &  6900 & 
0.03 &  -5.1 &  9.3 &  66.1 & 0.00 &  232 &  --1 SB &  \\
223 &  23230  & F5 II        &  3.77 &  0.42 & 0.04 & -2.3 &  5.9  &  6900 & 
0.03 &  -2.3 &  5.2 &  18.2 & 0.00 &  330 & --13     &  44   \\
224 &  37350  & F6 Ia        &  3.76 &  0.82 & 0.43 & -8.0 & 10.4  &  6600 & 
0.03 &  -8.0 & 20.0 & 274.8 & 0.00 &  167 &  +7V    &   0 \\
225 & 187929  & F6 Ibv       &  3.90 &  0.89 & 0.48 & -5.1 &  7.5  &  6600 & 
0.03 &  -5.1 &  9.3 &  72.3 & 0.00 &  222 & --15 SB  &   0 \\
226 &  57623  & F6 II        &  3.98 &  0.79 & 0.34 & -2.3 &  5.2  &  6490 & 
0.08 &  -2.4 &  5.2 &  21.1 & 0.00 &  307 & +23     &   0 \\
227 & 171635  & F7 Ib        &  4.77 &  0.61 & 0.13 & -5.1 &  9.5  &  6400 & 
0.07 &  -5.2 &  9.4 &  78.3 & 0.00 &  214 & --12V    &  18 \\
228 &   8890  & F7 Ib-III    &  2.02 &  0.60 & 0.10 & -2.3 &  4.0  &  6400 & 
0.07 &  -2.4 &  5.2 &  21.6 & 0.00 &  303 & --17 SB  &  17   \\
229 &  65228  & F7 II        &  4.20 &  0.72 & 0.22 & -2.3 &  5.8  &  6330 & 
0.11 &  -2.4 &  5.2 &  22.5 & 0.00 &  297 & +14     &  21 \\
230 &  54605  & F8 Ia        &  1.84 &  0.68 & 0.12 & -7.9 &  9.4c &  6100 & 
0.09 &  -8.0 & 19.0 & 315.8 & 0.00 &  152 & +34 SB  &  28 \\
231 & 194093  & F8 Ib        &  2.20 &  0.68 & 0.12 & -5.1 &  6.9  &  6100 & 
0.09 &  -5.2 &  9.4 &  87.0 & 0.00 &  203 &  --8     &  20   \\
232 & 172365  & F8 Ib-II     &  6.38 &  0.78 & 0.21 & -3.7 &  9.4  &  6100 & 
0.09 &  -3.8 &  7.2 &  45.6 & 0.00 &  245 & --19 &  \\ \hline

\end{tabular}
\end{document}

========================================================
Description of Table 3: Basic Properties of Atlas Stars
--------------------------------------------------------

This is table 3 from ``An Atlas of Ultraviolet P Cygni Profiles''
(Snow, T.P., Lamers, H.J.G.L.M., Lindholm, D.M., and Odell, A.P. 1994,
ApJS, 95, 163.

Table 3 lists the stars in the atlas in order of spectral type and
decreasing luminosity class.  It includes the atlas number, HD number,
spectral type, apparent visual magnitude, B-V color, B-V color excess,
absolute visual magnitude, distance modulus, effective temperature,
bolometric correction, bolometric magnitude, stellar mass, stellar radius,
gravity reduction due to radiation pressure, escape velocity, radial velocity,
and the observed component of the radial velocity.

