% Solar Active Region EUV Spectrum from SERTS, Roger J. Thomas & W.M. Neupert
% Published in Ap.J.Suppl. 91, 461-482, 1994  (Final Version with corrections)
% ----------------------------------------------------------------------------
%	Table 1

\begin{planotable}{rcccr}
\tablewidth{33pc}
\tablecaption{Wavelength Calibration Results}
\tablehead{
\colhead{Centroid} & \multicolumn{2}{c}{\underline{~~~~~Wavelength (\AA)~~~~~}}
 & & \colhead{Residual} \\[.2ex]
\colhead{($5~\mu m$ pixel)}
 & \colhead{SERTS} & \colhead{Standard} & \colhead{Ion}
 & \colhead{($m$\AA)}}
\startdata
   0~~~~ & 303.7820 & 303.7822 & He II & -0.2 \nl
 2096.58 & 326.7860 & 326.7856 & Ne II &  0.4 \nl
 4481.60 & 352.9547 & 352.9549 & Ne II & -0.2 \nl
 4832.04 & 356.7997 & 356.8001 & Ne II & -0.4 \nl
 4899.04 & 357.5348 & 357.5346 & Ne II &  0.2 \nl
 5254.22 & 361.4316 & 361.4321 & Ne II & -0.5 \nl
 5347.48 & 362.4548 & 362.4544 & Ne II &  0.4 \nl
 9303.68 & 405.8540 & 405.8538 & Ne II &  0.2 \nl
 9420.72 & 407.1377 & 407.1377 & Ne II &  0.0 \nl
12988.10 & 446.2553 & 446.2552 & Ne II &  0.1 \nl
13018.62 & 446.5899 & 446.5902 & Ne II & -0.3 \nl
13130.36 & 447.8148 & 447.8146 & Ne II &  0.2 \nl
\end{planotable}
